         180           8
 -0.538917658680004      -0.748337856561201      -0.899697544509989     
  -1.06274664023485       -1.22689687876955       -1.38998966008800     
  -1.51277494771132       -1.70602552947638     
  -22.7224638652942       -22.5808502581720       -22.2469941926761     
  -21.8888649649108       -21.4745318978031       -21.0469786564182     
  -20.6553967838101       -20.1298363911528     
 -2.237947066761969E-003  0.000000000000000E+000
  0.993183961761943       0.000000000000000E+000
  0.996216304800221       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
