         180           8
  -4.15654718402087       -4.53911360258516       -4.77367410257079     
  -5.00461133336630       -5.14512299298677       -5.19698517707125     
  -5.22677580841741       -5.33213463812423     
  -22.2429994383921       -22.4255757966531       -22.5908933842485     
  -22.8380712011694       -23.1988424197874       -23.5014119091616     
  -23.6905653874783       -23.8069153036331     
 -2.281990442044612E-003  0.000000000000000E+000
  0.993031204902772       0.000000000000000E+000
  0.996107629376007       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
