         180           8
 -0.610713894967686       -1.12529009492484       -1.65616104429437     
  -2.15264469414281       -2.64074555142442       -3.08363706519175     
  -3.43493570566571       -3.79353112452643     
   12.0064795964556        12.0316193725707        12.0853634556629     
   12.1398624756781        12.2185077164356        12.2634870319042     
   12.2637103580354        12.3138531741950     
 -7.681146910731676E-004  0.000000000000000E+000
   1.00139548893494       0.000000000000000E+000
  0.998468441878624       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
