         180           8
  -1.16039109090245       -1.53211931149691       -1.87238384536467     
  -2.15534690313744       -2.45577796773547       -2.65509111424507     
  -2.71382808090902       -2.71139863532502     
  -23.0930978205362       -23.3412523190660       -23.5252957269910     
  -23.7919990318965       -24.1133318553087       -24.4009196612029     
  -24.7422399063574       -25.0600219469397     
 -2.147517565223133E-003  0.000000000000000E+000
  0.992950061056173       0.000000000000000E+000
  0.996055402254242       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
