         180           8
 -0.192638422037069      -0.883056696492149       -1.51518357061571     
  -2.11830927656184       -2.71002165943684       -3.23654935547331     
  -3.68613710801552       -4.11268038096938     
   10.9787139711389        11.0838837034099        11.0940023491729     
   11.1151196515655        11.1474408460804        11.1532986979882     
   11.1480006169224        11.1392307765299     
 -5.631191279127420E-004  0.000000000000000E+000
   1.00151388804976       0.000000000000000E+000
  0.998420300400765       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
