         180           8
   1.53650086257345        1.09200143347691       0.740729299088036     
  0.398392271525352       8.426557968940476E-002 -0.177798747017410     
 -0.400234099871569      -0.443627481360752     
  -23.0792210163244       -23.3357865222112       -23.5612113945190     
  -23.8711024596645       -24.2604545352195       -24.5553318679739     
  -24.8429070708030       -25.2414817382074     
 -2.145237204716619E-003  0.000000000000000E+000
  0.993161830295034       0.000000000000000E+000
  0.996344869793652       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
