         180           8
 -0.142720196297695      -0.726213867246833       -1.03378049664356     
  -1.33095609398148       -1.57799081456196       -1.74794546804298     
  -1.85552478655156       -1.99718297327670     
   14.1160897547572        14.0126120549184        13.9883610614453     
   13.9649547243771        13.9397092812344        13.9359231597101     
   13.9286878395927        13.7173205637732     
 -1.255097114207166E-003  0.000000000000000E+000
   1.00156977093319       0.000000000000000E+000
  0.998483208145821       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
