         180           8
  -4.44909436374792       -4.72270673268171       -4.99170297969451     
  -5.21097575024214       -5.34107297837182       -5.44181597497301     
  -5.53914749461925       -5.59593688557674     
  -21.5291670431839       -21.8923725355838       -22.1187760761668     
  -22.4207927571678       -22.8504277638516       -23.1716525955820     
  -23.4082827914922       -23.5881237693415     
 -2.410139713156874E-003  0.000000000000000E+000
  0.993243830914329       0.000000000000000E+000
  0.996175387721969       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
