         180           8
 -0.397524707157794      -0.570218424329500      -0.775067065401184     
 -0.931210290280231       -1.09273028860203       -1.22940127362507     
  -1.31326474339884       -1.47627216466156     
  -21.8030690476066       -21.4892852744342       -21.1662889240911     
  -20.7681319826865       -20.4058761030051       -20.0127340402180     
  -19.6187097141643       -19.2924362916813     
 -2.238742661063674E-003  0.000000000000000E+000
  0.993387567549244       0.000000000000000E+000
  0.996254145032083       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
