         180           3
  0.175825012690583       -1.46729568855342       -2.25554501596132     
   13.8741221196201        14.1083589039155        14.3046623447919     
 -1.035052041583575E-003  0.000000000000000E+000
   1.00134838990496       0.000000000000000E+000
  0.998276712719796       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
