         180           8
  -3.92667523377156       -4.27619012401037       -4.56934600158357     
  -4.83499212637011       -5.01764399096194       -5.06878559328574     
  -5.07846792195986       -5.20814190422779     
  -21.5315574015531       -21.7703139836698       -21.8713819337192     
  -22.0490015786265       -22.3676078304557       -22.6191465913573     
  -22.7763380495109       -22.9507255583407     
 -2.182972091900350E-003  0.000000000000000E+000
  0.993026041824764       0.000000000000000E+000
  0.996083913590695       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
