         180           8
  -1.70394778572649       -2.18192192655458       -2.51468904878794     
  -2.82723250731423       -3.07950475874416       -3.24964122294177     
  -3.32395826964564       -3.27005413797518     
  -21.9004525424089       -22.1422239934387       -22.2979471610065     
  -22.5223530332862       -22.8830933679922       -23.2183280498100     
  -23.5022793374173       -23.8773404818378     
 -2.150991149870901E-003  0.000000000000000E+000
  0.993154298379923       0.000000000000000E+000
  0.996146642365467       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
