         180           8
   1.25961660454758       0.753261870376516       0.401366810934346     
  6.342752588053917E-002 -0.195921195841195      -0.465013071651208     
 -0.704051231106152      -0.820610338918847     
  -22.0846676178447       -22.2646356072094       -22.4464487473250     
  -22.8029963387868       -23.2330842798766       -23.5408579911820     
  -23.7844363145342       -24.2067367115779     
 -2.119724475047276E-003  0.000000000000000E+000
  0.993353361142367       0.000000000000000E+000
  0.996182750446156       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
