         180           3
   7.40239541413912        5.24100618462480        3.27643825699576     
   13.3281373859716        13.3538956229840        14.1457488079426     
 -6.806245663470968E-004  0.000000000000000E+000
   1.00162329067339       0.000000000000000E+000
  0.998296496903926       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
