         180           8
   1.34256675142645       0.575149611239964      -0.141982762044101     
 -0.863487717526136       -1.49898160780876       -2.07675432789019     
  -2.57750431781089       -3.09741268820129     
  -17.1729483664366       -17.3873104400779       -17.6259461767267     
  -17.8388620285224       -18.0175954672637       -18.1566384654369     
  -18.2565102728325       -18.4713310799825     
 -2.137752852599469E-003  0.000000000000000E+000
  0.992882156124200       0.000000000000000E+000
  0.995726949710601       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
