         180           3
 -0.468923743301406       -2.28710014403994       -3.54944991456110     
   13.2440545883400        13.4067548167257        13.6420904126492     
 -6.668492578696841E-004  0.000000000000000E+000
   1.00117351275372       0.000000000000000E+000
  0.997908678981162       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
