         180           8
  -1.70451310108575       -2.08800710002321       -2.42455155933732     
  -2.72385086109402       -3.03848123460636       -3.20978069668054     
  -3.25005502173064       -3.32251234509819     
  -21.6561094643557       -21.9265040029976       -22.0891972859164     
  -22.3566037440614       -22.6817291022398       -22.9531663766391     
  -23.1935285196300       -23.4330432490738     
 -1.991154083276368E-003  0.000000000000000E+000
  0.992748757383605       0.000000000000000E+000
  0.995618162583450       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
