         180           3
  5.134412995861664E-002  -2.16669800798471       -3.92025158433770     
   12.0887414081074        12.2972535126508        12.3000062451655     
 -3.495264323190063E-004  0.000000000000000E+000
   1.00142386507111       0.000000000000000E+000
  0.997974090231139       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
