         180           8
   1.12035481133143       0.708975115072311       0.388164895590146     
  7.420292433259225E-002 -0.214240777578197      -0.445076083452236     
 -0.653314521937975      -0.727161669938055     
  -21.7377257715555       -21.9938204860146       -22.2037604811737     
  -22.5516228477513       -22.9075924438838       -23.1783329717652     
  -23.3965935124546       -23.9440653098216     
 -1.991505268165351E-003  0.000000000000000E+000
  0.992935459511484       0.000000000000000E+000
  0.995658678049876       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
