         180           8
 -0.681921050054503      -0.272216217818503       0.293661449078876     
  0.784530442859132        1.32878632884750        1.92626677908343     
   2.48083511435633        3.04690327290534     
   13.3675429545864        13.3439127801728        13.5335197312971     
   13.7007430935517        13.9335388308654        14.1757658220050     
   14.4025992447531        14.7794029566870     
 -1.137967214506699E-003  0.000000000000000E+000
   1.00195478701491       0.000000000000000E+000
  0.998051338335534       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
