         180           8
  -1.23929709369486       -1.45436468914028       -1.66817702009051     
  -1.85797935041805       -2.03400326157568       -2.11901107336320     
  -2.24034630153500       -2.29052614601796     
  -21.5744732778185       -21.4237672218125       -21.0427284073111     
  -20.6450961521515       -20.2217038865340       -19.7508852989726     
  -19.3797417390414       -18.9656868493687     
 -2.184180282549799E-003  0.000000000000000E+000
  0.992718540646630       0.000000000000000E+000
  0.995394133332560       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
