         180           8
  -1.78533387459855       -2.11720862517918       -2.47321861235765     
  -2.79125695096150       -3.08366904453435       -3.23377820760275     
  -3.27011400097355       -3.38028369300556     
  -21.7502394803224       -21.9233092083726       -22.1060959618144     
  -22.4015207405030       -22.8405241171487       -23.2209690716192     
  -23.4960030549282       -23.7412241010180     
 -1.995599328507214E-003  0.000000000000000E+000
  0.992432379208330       0.000000000000000E+000
  0.995592369395205       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
