         180           3
  0.582783455128090      -0.854463850303567       -1.59730625753436     
   14.8015538674102        14.9115060559680        15.3679678195457     
 -1.128143071091973E-003  0.000000000000000E+000
   1.00132195625603       0.000000000000000E+000
  0.998102431932396       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
