         180           8
  -5.30613620630298       -5.57502338544471       -5.87722890367750     
  -6.05857597591514       -6.13043487726421       -6.15800877485072     
  -6.13847124789588       -6.26386069344747     
  -21.1916236504946       -21.3646648358970       -21.5426529183265     
  -21.8240272586266       -22.1059246850681       -22.2421823958239     
  -22.3563339836116       -22.4234477743073     
 -2.198506900932453E-003  0.000000000000000E+000
  0.992407754050628       0.000000000000000E+000
  0.995457860228055       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
