         180           3
 -0.202900720390068       -1.82054472731243       -2.70053257506092     
   14.0288688065868        14.1891704569439        14.5053158908846     
 -9.865830443358593E-004  0.000000000000000E+000
   1.00130242952591       0.000000000000000E+000
  0.998091019814908       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
