         180           8
  -3.95340270467628       -4.30060005945595       -4.60438425116815     
  -4.85941567922457       -5.02720543390865       -5.07652179205450     
  -5.10660829006127       -5.18149912155480     
  -21.8375251933101       -22.0789408424717       -22.2220108669687     
  -22.4407758847162       -22.8040567237075       -23.0279990668536     
  -23.1509977728438       -23.3513879959913     
 -2.071209932772019E-003  0.000000000000000E+000
  0.992459895041994       0.000000000000000E+000
  0.995484442977967       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
