         180           3
 -5.222934772543424E-002  -2.05467498196475       -3.51221613964448     
   13.2779818207828        13.3210551699357        13.2633049510821     
 -6.632275422174188E-004  0.000000000000000E+000
   1.00121298359394       0.000000000000000E+000
  0.998094688215038       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
