         180           8
  -1.52444908607027       -1.92034490901991       -2.24398625663018     
  -2.53134396448857       -2.75709378500054       -2.95435846061206     
  -3.01058619753485       -3.12025916021689     
  -21.6299619014964       -21.9183200709842       -22.1690428564901     
  -22.5563232702743       -22.9836830225827       -23.3719005122342     
  -23.7549053468420       -24.2163047795649     
 -2.074077597184191E-003  0.000000000000000E+000
  0.992607604388826       0.000000000000000E+000
  0.995801949236557       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
