         180           3
 -0.759444893365037       -1.96573153421324       -2.36994361262451     
   14.4461722336041        14.6732059100143        15.3353599544678     
 -1.005178496663017E-003  0.000000000000000E+000
   1.00130412152106       0.000000000000000E+000
  0.998214342532432       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
