         180           8
  0.976192920022840       0.350543414523907      -0.196696874412413     
 -0.731149862394366       -1.23529721846100       -1.70960413886796     
  -2.08979043117891       -2.38954132348705     
   14.0582882717629        14.0555755321594        14.1497328045410     
   14.1905139925397        14.1892568048974        14.2048403125599     
   14.2241032297612        14.2699193442125     
 -8.658616410163538E-004  0.000000000000000E+000
   1.00145540516050       0.000000000000000E+000
  0.998606733386102       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
