         180           8
  -2.58758663362961       -2.94819073041439       -3.30194976124166     
  -3.64980337951683       -3.90795564897294       -4.11862655162946     
  -4.36335970491163       -4.27723247680189     
  -19.8209790258377       -20.1216500926677       -20.3498312416539     
  -20.6134900126685       -20.9178575681773       -21.1981778088101     
  -21.4002479937510       -21.8119869150401     
  1.104467645692974E-004  0.000000000000000E+000
  0.993118994701651       0.000000000000000E+000
  0.996183726621279       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
