         180           8
  0.987841619913421       0.588716650132185       0.150273297384606     
 -0.224485470170112      -0.591883253811507      -0.946504284848758     
  -1.15805197791239       -1.33069174176963     
   14.9953129106127        15.1579490470563        15.1765996588940     
   15.2414518482040        15.3123228824988        15.3535092978711     
   15.3409687018714        15.3721808082078     
 -1.080578901130704E-003  0.000000000000000E+000
   1.00141436086668       0.000000000000000E+000
  0.998666272743289       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
