         180           8
  -5.14023862510200       -5.43215171669285       -5.74849487718931     
  -5.93552951912627       -5.99972234971523       -6.20110262231365     
  -6.47239521940221       -6.39590808645626     
  -19.5248811968451       -19.7217133661761       -19.8629602615229     
  -20.1079396917816       -20.5225654887776       -20.7901263849376     
  -20.8282720549708       -21.1491048578201     
 -6.873817228494298E-005  0.000000000000000E+000
  0.993230925811004       0.000000000000000E+000
  0.996214453222213       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
