         180           8
  0.556954510214541       4.776896459843805E-002 -0.468306879984484     
 -0.991355645482073       -1.48297686920919       -1.91218876327835     
  -2.27636329497412       -2.57279054667690     
   13.7292308971088        13.8100656070316        13.9009628037163     
   13.9109980983204        13.9578952286151        14.0595937600452     
   14.1503108021962        14.1750077003695     
 -8.203169428361383E-004  0.000000000000000E+000
   1.00150942681228       0.000000000000000E+000
  0.998713804103598       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
