         180           8
  -2.43232948326098       -2.75584083002937       -3.11189965303834     
  -3.45674818477132       -3.73454245827625       -3.95447737140816     
  -4.18003899094511       -4.04358391721841     
  -20.2260453181374       -20.3623211428841       -20.5822251828438     
  -20.8439456237645       -21.1079214737104       -21.2945786364515     
  -21.4480828924823       -21.8181969336888     
 -1.361636318656035E-005  0.000000000000000E+000
  0.993343138652886       0.000000000000000E+000
  0.996428960768619       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
