         180           8
  0.853320448402907       0.163249315578563      -0.445889007112018     
  -1.02463944148883       -1.59510411058002       -2.10691883244263     
  -2.53668259855704       -2.92426453296603     
   13.1336912752916        13.2347564727368        13.1343152567604     
   13.0615126965786        13.0176302265056        12.9757589889112     
   12.9876225675763        12.9618176991950     
 -5.975120614665313E-004  0.000000000000000E+000
   1.00147389410947       0.000000000000000E+000
  0.998695201027836       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
