         180           8
 -0.327577382543897      -0.700015037585902       -1.07033658420868     
  -1.41718917963049       -1.76792988095393       -2.06437719139907     
  -2.32289347773495       -2.40693867367468     
  -19.9479012936167       -20.2371829348925       -20.5960865271518     
  -21.0145542467688       -21.4382177001839       -21.7390351029211     
  -21.9572458014963       -22.3457202854425     
  1.852669595561727E-005  0.000000000000000E+000
  0.993481355031740       0.000000000000000E+000
  0.996519745755933       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
