         180           8
  0.699522101241571       0.261358270413091      -0.103617080056463     
 -0.415672839727537      -0.667645520199703      -0.851112974643566     
 -0.971799688139350       -1.03200249933303     
   15.3016227547394        15.3294876650960        15.3587301532636     
   15.4181990854311        15.4999317814670        15.5320351408190     
   15.2160092566367        14.6884566894854     
 -1.161567879244550E-003  0.000000000000000E+000
   1.00157699478618       0.000000000000000E+000
  0.998651793514104       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
