         180           8
  -5.24666470900457       -5.52528810148702       -5.84711321601356     
  -6.16566858082275       -6.19202226241111       -6.02652460049349     
  -6.23394507096510       -6.27220151305701     
  -18.9328287396856       -19.1646682593481       -19.3210133446750     
  -19.7550181732779       -20.8908554725409       -21.7196623634178     
  -21.4683195802498       -22.2143675798202     
 -1.092595220328280E-004  0.000000000000000E+000
  0.993552335023557       0.000000000000000E+000
  0.996550722264586       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
