         180           3
   8.57543169052411        6.47662666550355        4.37424606004021     
   15.1361361582520        15.7359523445558        16.1421311180700     
 -7.961421182269382E-004  0.000000000000000E+000
   1.00190784156423       0.000000000000000E+000
  0.999030102947376       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
