         180           3
   8.53067076021408        6.40583416601639        4.38323083023005     
   15.2253066240841        15.6729282374015        16.0309808404353     
 -7.360337486338551E-004  0.000000000000000E+000
   1.00193761193197       0.000000000000000E+000
  0.999054441688842       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
