         180           8
  0.549382914682354      -7.486391604401853E-002 -0.718250390361776     
  -1.35925069526706       -1.95307368536766       -2.53694587779527     
  -3.08580248239412       -3.61813909179949     
  -14.1530373732230       -14.1897688702939       -14.3248272407456     
  -14.5464669444786       -14.7634566659652       -15.0287804365567     
  -15.3390282777877       -15.7401742832872     
  6.668801024302352E-005  0.000000000000000E+000
  0.993526336549367       0.000000000000000E+000
  0.996424522450523       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
