         180           3
   8.52088807847681        6.42013443875870        4.36466108562795     
   15.1172381026248        15.6497646250204        16.0078746479463     
 -7.622694163072155E-004  0.000000000000000E+000
   1.00190177365557       0.000000000000000E+000
  0.998955515758025       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
