         180           8
  0.519498438833105      -0.170417069641462      -0.781861317939687     
  -1.42185260151063       -2.04521539698788       -2.60720926792829     
  -3.15192078244614       -3.63600243022994     
  -14.2337942662845       -14.2622512511496       -14.3939910207005     
  -14.5612620967516       -14.8023879705814       -15.1625275588205     
  -15.4929360436087       -15.7417421141551     
  2.103295894534498E-005  0.000000000000000E+000
  0.993527190504530       0.000000000000000E+000
  0.996351900906185       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
