         180           8
  0.561722292412511      -6.519089345475583E-002 -0.704628127664857     
  -1.35121885166433       -1.99226100524126       -2.56578774705831     
  -3.12289169789146       -3.74838197512955     
  -14.2937181992537       -14.3593856375349       -14.4302838769290     
  -14.5820305287112       -14.8422677013887       -15.1512738128321     
  -15.4765065721314       -15.7961792609187     
  3.056708443748053E-005  0.000000000000000E+000
  0.993684621405175       0.000000000000000E+000
  0.996418442736084       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
