         180           3
  0.857295150960885      -0.384908251480915      -0.913871333489508     
   15.6239585709077        15.8734074854399        15.4272234945503     
 -1.159500143774869E-003  0.000000000000000E+000
   1.00161945914476       0.000000000000000E+000
  0.998396541436862       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
