         180           8
  -4.91169073075234       -5.46904855897651       -6.16471545546558     
  -5.90252166095701       -3.76572988301160       -3.16761318990673     
  -5.35905330991893       -6.07872897359721     
  -18.4672482601055       -18.5225501958989       -18.2960370179304     
  -19.6492494180520       -22.9599518808499       -23.6072953304897     
  -21.6504145352528       -21.4451975227300     
  1.773035226050480E-004  0.000000000000000E+000
  0.993865408707522       0.000000000000000E+000
  0.996733627170072       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
