         180           3
  0.874795036494170      -0.471313727612525       -1.04026646159060     
   17.3514824487088        16.8898090503606        17.6357459781834     
 -1.230509190753863E-003  0.000000000000000E+000
   1.00164658385259       0.000000000000000E+000
  0.998445484497669       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
