         180           8
  -5.38953204006786       -5.73838412958167       -6.06788177266687     
  -6.33062750699955       -6.39095958791091       -6.52613339113393     
  -6.82657574314365       -6.82939308458481     
  -16.7262965598104       -17.0157460570483       -17.1660521698598     
  -17.6652453991643       -18.5000682357445       -18.8761127171346     
  -18.8833704085929       -19.1208540114637     
  8.442748378302725E-005  0.000000000000000E+000
  0.993266053513110       0.000000000000000E+000
  0.996142635972907       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
