         180           8
  3.072445184061131E-002 -0.668188512047353       -1.27642507326850     
  -1.90662567836820       -2.49110196610806       -3.07885120118163     
  -3.64901565183371       -4.17038556795314     
  -12.8840698415041       -13.0158438993991       -13.1252460108403     
  -13.2890431772659       -13.4662442424264       -13.6797164652161     
  -13.9216432331712       -14.0578452515851     
  3.212437253033306E-004  0.000000000000000E+000
  0.992957821573908       0.000000000000000E+000
  0.995843376893077       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
